\chapter{System private functions}
\hypertarget{md_workspace_2post-scarcity_2docs_2_system-private-functions}{}\label{md_workspace_2post-scarcity_2docs_2_system-private-functions}\index{System private functions@{System private functions}}
\label{md_workspace_2post-scarcity_2docs_2_system-private-functions_autotoc_md156}%
\Hypertarget{md_workspace_2post-scarcity_2docs_2_system-private-functions_autotoc_md156}%
 {\bfseries{actually, I think this is a bad idea --- or at least needs significantly more thought!}}

System-\/private functions are functions private to the system, which no normal user is entitled to access; these functions normally have an \href{Access-control.html}{\texttt{ access control}} value of NIL.\hypertarget{md_workspace_2post-scarcity_2docs_2_system-private-functions_autotoc_md157}{}\doxysection{\texorpdfstring{(sys-\/access-\/control arg)}{(sys-access-control arg)}}\label{md_workspace_2post-scarcity_2docs_2_system-private-functions_autotoc_md157}
System private. Takes one argument. Returns the access control list of its argument.\hypertarget{md_workspace_2post-scarcity_2docs_2_system-private-functions_autotoc_md158}{}\doxysection{\texorpdfstring{(sys-\/readable arg user)}{(sys-readable arg user)}}\label{md_workspace_2post-scarcity_2docs_2_system-private-functions_autotoc_md158}
System private. Takes two arguments. Returns {\ttfamily TRUE} if the first argument is readable by the reader represented by the second argument; else {\ttfamily NIL}. 